This information is subject to change without notice.See Notice of Disclaimer on Title Page4-2104.2.11 Network Terminations (NT-1�s)COMPANY NAMEPRODUCT NAME

Adtran, Inc.901 Explorer Blvd.Huntsville, AL 35806NT1 ACE & PS2ISDN Network TerminationNI-1?NI-2?NowNow

Leslie S. Conway(205) 971-8000 & Power SupplyPrice$395 (NT-1)$150 ((PS-2)

Additional Features:¥ Small unit for desk top use¥ Supports passive bus¥ 9.5 sec reserve power with PS-2Stand-alone orRack Mount?Standalone

¥ 9.5 sec reserve power with PS-2¥ Provides 12 watts of power to terminal equipment¥ TE power short circuit protectionS/T Power?PS-2 (with PS-2power supply)

Adtran, Inc.NT1 T400NI-1?NI-2?NowNow

NT-1 Standalone and CircuitPackPriceNT1 circuit packNT1 Standalone with power supply$395$575

Additional Features:¥ Supports passive bus¥ Shelf houses 12 circuit packsStand-alone orRack Mount?Standalone & RackMount

¥ Stand alone housing includes power supply¥ TE power short circuit protectionS/T Power?PS-1 and PS-2

This information is subject to change without notice.See Notice of Disclaimer on Title Page4-2114.2.11 Network Terminations (NT-1�s)COMPANY NAMEPRODUCT NAME

AT&T Network Systems263 Sherman RoadNaperville, IL 60566-7050NT 1NI-1?NI-2?YesYes

Don Ziemann(708) 713-7039PriceContact Distributorfor current price

Additional Features:Stand-alone orRack Mount?Both

S/T Power?Available

4.2.11 Network Terminations (NT-1�s)COMPANY NAMEPRODUCT NAME

Siemens Stromberg-Carlson900 Broken Sound PkwyBoca Raton, FL 33487NT-1ISDN Network TerminatorNI-1?NI-2?NowNow

Dan Bonner(407) 955-3037Price

Additional Features:¥Built in 110 V power supply¥Built in Battery keeps ISDN device in service in the eventof power failureStand-alone orRack Mount?Standalone

¥Floor, Desk or Wall MountS/T Power?PS-2

This information is subject to change without notice.See Notice of Disclaimer on Title Page4-2124.2.11 Network Terminations (NT-1�s)COMPANY NAMEPRODUCT NAME

Tone Commander Sys.4370 150th Ave. NERedmond, WA 98073NTIU - 220TCISDN Network TerminationUnitNI-1?NI-2?4Q934Q93

Norton Lovold(800) 524-0024Price$195.00 (NT-1)$30.00 (Power Supply)

Additional Features:¥ Fully compatible with AT&T NT1M-200 Rack¥ Desk top or wall mountable¥ Status indicator lightsStand-alone orRack Mount?Either

¥ Manual reset switch¥ Self resetting short circuit power protection¥ Provides 16 watts of power to terminal equipmentS/T Power?PS-1 and PS-2